0 .2 .4 .6 .8 1 0

.5

1

1.5

2

0 .2 .4 .6 .8 1 0

.5

1

1.5

2

0 .2 .4 .6 .8 1 0

.2

.4

.6

.8

1

0 .2 .4 .6 .8 1 0

.2

.4

.6

.8

1

Figure 17

Volume Weighting Mass Weighting